Draft of 7:59 am, Wednesday, November 8, 1995 58

Input Image

1: 9.99478e-1 2: 4.34991e-5 3: 4.34991e-5 4: 4.34991e-5

5: 4.34991e-5 6: 4.34991e-5 7: 4.34991e-5 8: 4.34991e-5

9: 4.34991e-5 10: 4.34991e-5 11: 4.34991e-5 12: 4.34991e-5

13: 4.34991e-5 14: 1.89316e-9 15: 1.89316e-9 16: 1.89316e-9

17: 1.89316e-9 18: 1.89316e-9 19: 1.89316e-9 20: 1.89316e-9

Figure 7.20 The 20 top segmentations. The region size is 64. There are 23 models. Image Filename: brod1-64-23.